/*
 Navicat Premium Data Transfer

 Source Server         : JavaWeb
 Source Server Type    : MySQL
 Source Server Version : 50737 (5.7.37)
 Source Host           : localhost:3306
 Source Schema         : login

 Target Server Type    : MySQL
 Target Server Version : 50737 (5.7.37)
 File Encoding         : 65001

 Date: 26/09/2022 21:38:54
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for user
-- ----------------------------
DROP TABLE IF EXISTS `user`;
CREATE TABLE `user`  (
  `uid` int(11) NOT NULL AUTO_INCREMENT,
  `uname` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `uaccount` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `upassword` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  PRIMARY KEY (`uid`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 7 CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of user
-- ----------------------------
INSERT INTO `user` VALUES (1, '皮卡丘', '123456', '123456');
INSERT INTO `user` VALUES (4, '杰尼龟', '1234567', '123456');
INSERT INTO `user` VALUES (6, '杰尼龟', '1234568', '123456');

SET FOREIGN_KEY_CHECKS = 1;
